Augsburger Straße (Charlottenburg, Berlin)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Augsburger Straße
location: Charlottenburg, Berlin, 52.501699 13.335415