Wetter (Ruhr)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Wetter (Ruhr)
location: 51.383611 7.390556
identifier: 4065854-5
identifier: 2809984