Wave Crest (Far Rockaway, New York)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Wave Crest
location: Far Rockaway, New York City, New York, 40.59955 -73.76374
identifier: 5143434