Hotel Albany (Washington, D. C.)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hotel Albany
location: 17th Street / H Street Northwest
Washington, D. C.
38.90022 -77.03947
1915 existentes Hotel in unmittelbarer Nähe des White House