Marienstraße 18 (Dresden)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Marienstraße 18
location: Dresden, 51.048826 13.732944