Nováček, Ottokar: Concerto Eroico op. 8
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Ottokar Nováček, Concerto Eroico, 8, Berlin, Berliner Philharmoniker, Artur Nikisch, Klavier: Ferruccio Busoni, Leipzig, Kopenhagen, Ferruccio Busoni