Berlioz, Hector: Roméo et Juliette op. 17
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hector Berlioz, Roméo et Juliette, Symphonie dramatique für Soli, 3 Chöre und Orchester, 17, H 79, 300019386, Paris